mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π _SK

→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π _SK

→^-D

1

→^-D^{Fit Parameters} 192 ± N1 = 36667 192 ± N2 = 36740 18 ± Nbkgd1 = 114 18 ± Nbkgd2 = 110 0.0000056 ± md = 1.8694136 0.000036 ± sigmap1 = 0.002776 8.0 ± xi = -24.63

= 77.9 2 2χ = 85.1, 1 2χ

Fit Parameters