mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 257 ± N1 = 49810 258 ± N2 = 50053 204 ± Nbkgd1 = 25480 205 ± Nbkgd2 = 25653 0.0000074 ± md = 1.8643464 0.017 ± p = 0.607 0.000051 ± sigmap1 = 0.006834 0.85 ± xi = -19.250

= 98.5 2 2χ = 63.0, 1 2χ

Fit Parameters