mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D^{Fit Parameters} 132 ± N1 = 8167 132 ± N2 = 8174 225 ± Nbkgd1 = 41308 224 ± Nbkgd2 = 40815 0.000018 ± md = 1.869126 0.012 ± p = 0.509 0.00021 ± sigmap1 = 0.00447 0.60 ± xi = -10.150

= 48.4 2 2χ = 48.2, 1 2χ

Fit Parameters