mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 297 ± N1 = 75356 299 ± N2 = 76017 213 ± Nbkgd1 = 32209 214 ± Nbkgd2 = 32481 0.0000044 ± md = 1.8642715 0.015 ± p = 0.505 0.000034 ± sigmap1 = 0.004334 0.73 ± xi = -10.048

= 79.4 2 2χ = 118.3, 1 2χ

Fit Parameters