mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 224 ± N1 = 26280 227 ± N2 = 26584 306 ± Nbkgd1 = 69508 308 ± Nbkgd2 = 70211 0.000011 ± md = 1.869076 0.0097 ± p = 0.5001 0.000078 ± sigmap1 = 0.004929 0.48 ± xi = -9.908

= 49.9 2 2χ = 65.7, 1 2χ

Fit Parameters