mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 262 ± N1 = 29051 265 ± N2 = 29639 407 ± Nbkgd1 = 125530 406 ± Nbkgd2 = 124415 0.000013 ± md = 1.869081 0.0073 ± p = 0.5064 0.00012 ± sigmap1 = 0.00781 0.36 ± xi = -8.850

= 52.5 2 2χ = 59.2, 1 2χ

Fit Parameters