mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D^{Fit Parameters} 214 ± N1 = 16506 215 ± N2 = 16449 405 ± Nbkgd1 = 134848 405 ± Nbkgd2 = 134023 0.000015 ± md = 1.869062 0.0067 ± p = 0.5037 0.00014 ± sigmap1 = 0.00457 0.33 ± xi = -9.348

= 70.0 2 2χ = 53.2, 1 2χ

Fit Parameters