mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 372 ± N1 = 102359 375 ± N2 = 103346 307 ± Nbkgd1 = 58266 310 ± Nbkgd2 = 58967 0.0000053 ± md = 1.8643180 0.011 ± p = 0.569 0.000036 ± sigmap1 = 0.007120 0.57 ± xi = -17.657

= 128.7 2 2χ = 86.3, 1 2χ

Fit Parameters