mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^-π ^+K→^-D

1

-π ^-π ^+K→^-D Fit Parameters 286 ± N1 = 76393 288 ± N2 = 77226 128 ± Nbkgd1 = 10860 130 ± Nbkgd2 = 11126 0.0000041 ± md = 1.8691083 0.025 ± p = 0.505 0.000036 ± sigmap1 = 0.004353 1.2 ± xi = -14.57

= 71.6 2 2χ = 90.8, 1 2χ

Fit Parameters