mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 223 ± N1 = 26083 225 ± N2 = 26376 306 ± Nbkgd1 = 69704 308 ± Nbkgd2 = 70418 0.000011 ± md = 1.869104 0.0096 ± p = 0.4977 0.000077 ± sigmap1 = 0.004981 0.48 ± xi = -10.065

= 49.7 2 2χ = 61.2, 1 2χ

Fit Parameters