mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π _SK

→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π _SK

→^-D

1

→^-D^{Fit Parameters} 120 ± N1 = 11652 120 ± N2 = 11775 99 ± Nbkgd1 = 7006 98 ± Nbkgd2 = 6838 0.000011 ± md = 1.869104 0.032 ± p = 0.526 0.000063 ± sigmap1 = 0.002510 1.6 ± xi = -9.69

= 72.9 2 2χ = 52.6, 1 2χ

Fit Parameters