mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-K

→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+K

→^0D

1

→^0D^{Fit Parameters} 280 ± N1 = 75440 281 ± N2 = 75870 91 ± Nbkgd1 = 5233 91 ± Nbkgd2 = 5182 0.0000042 ± md = 1.8642694 0.020 ± p = 0.194 0.000029 ± sigmap1 = 0.004063 1.1 ± xi = -0.10

= 96.2 2 2χ = 95.1, 1 2χ

Fit Parameters