mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 454 ± N1 = 153449 457 ± N2 = 154724 368 ± Nbkgd1 = 82461 371 ± Nbkgd2 = 83292 0.0000044 ± md = 1.8642818 0.0098 ± p = 0.5598 0.000031 ± sigmap1 = 0.006939 0.49 ± xi = -16.250

= 96.5 2 2χ = 54.0, 1 2χ

Fit Parameters