mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^+ K^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^- K^+K→^-D

1

-π ^- K^+K→^-D Fit Parameters 125 ± N1 = 10212 125 ± N2 = 10154 164 ± Nbkgd1 = 21331 164 ± Nbkgd2 = 21456 0.000013 ± md = 1.869095 0.017 ± p = 0.504 0.00015 ± sigmap1 = 0.00497 0.85 ± xi = -9.554

= 73.2 2 2χ = 63.5, 1 2χ

Fit Parameters