mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

-π ^-π ^+K→^-D

1

-π ^-π ^+K→^-D Fit Parameters 354 ± N1 = 116996 356 ± N2 = 118309 155 ± Nbkgd1 = 15995 157 ± Nbkgd2 = 16304 0.0000033 ± md = 1.8690804 0.023 ± p = 0.590 0.000029 ± sigmap1 = 0.004192 1.1 ± xi = -14.92

= 163.2 2 2χ = 192.7, 1 2χ

Fit Parameters