mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 271 ± N1 = 39103 273 ± N2 = 39315 365 ± Nbkgd1 = 98446 368 ± Nbkgd2 = 99891 0.0000092 ± md = 1.8690813 0.0082 ± p = 0.5044 0.000062 ± sigmap1 = 0.004810 0.41 ± xi = -10.239

= 57.2 2 2χ = 59.4, 1 2χ

Fit Parameters