mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π _SK

→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π _SK

→^-D

1

→^-D^{Fit Parameters} 145 ± N1 = 17502 146 ± N2 = 17709 112 ± Nbkgd1 = 8789 110 ± Nbkgd2 = 8532 0.0000091 ± md = 1.8690792 0.030 ± p = 0.563 0.000048 ± sigmap1 = 0.002380 1.5 ± xi = -10.04

= 103.2 2 2χ = 68.7, 1 2χ

Fit Parameters