mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D^{Fit Parameters} 250 ± N1 = 24728 250 ± N2 = 24680 462 ± Nbkgd1 = 176106 461 ± Nbkgd2 = 174773 0.000011 ± md = 1.869065 0.0058 ± p = 0.5062 0.00011 ± sigmap1 = 0.00433 0.28 ± xi = -9.551

= 57.2 2 2χ = 51.3, 1 2χ

Fit Parameters