mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 213 ± N1 = 39531 213 ± N2 = 39429 153 ± Nbkgd1 = 17317 153 ± Nbkgd2 = 17407 0.0000060 ± md = 1.8642635 0.0096 ± p = 0.4946 0.000047 ± sigmap1 = 0.004132 0.43 ± xi = -9.550

= 66.0 2 2χ = 73.3, 1 2χ

Fit Parameters