mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 +π _SK

→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 -π _SK

→^-D

1

→^-D^{Fit Parameters} 103 ± N1 = 5773 100 ± N2 = 5853 83 ± Nbkgd1 = 1861 79 ± Nbkgd2 = 1777 0.000015 ± md = 1.869084 0.40 ± p = 0.60 0.00015 ± sigmap1 = 0.00225 18 ± xi = -11.2

= 57.4 2 2χ = 43.4, 1 2χ

Fit Parameters