mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 156 ± N1 = 13304 155 ± N2 = 13153 204 ± Nbkgd1 = 30628 204 ± Nbkgd2 = 30788 0.000016 ± md = 1.869098 0.015 ± p = 0.526 0.00014 ± sigmap1 = 0.00684 0.75 ± xi = -10.553

= 70.1 2 2χ = 60.1, 1 2χ

Fit Parameters