mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-K

→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+K

→^0D

1

→^0D^{Fit Parameters} 166 ± N1 = 25730 167 ± N2 = 26227 60 ± Nbkgd1 = 1848 59 ± Nbkgd2 = 1779 0.0000074 ± md = 1.8642713 0.22 ± p = 0.20 0.000055 ± sigmap1 = 0.003987 18 ± xi = -2.2

= 70.3 2 2χ = 76.1, 1 2χ

Fit Parameters