mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^-π ^+K→^-D

1

-π ^-π ^+K→^-D Fit Parameters 207 ± N1 = 40196 209 ± N2 = 40680 92 ± Nbkgd1 = 5544 92 ± Nbkgd2 = 5584 0.0000056 ± md = 1.8690932 0.041 ± p = 0.634 0.000049 ± sigmap1 = 0.004077 1.9 ± xi = -16.90

= 93.6 2 2χ = 83.3, 1 2χ

Fit Parameters