mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 252 ± N1 = 50510 254 ± N2 = 50777 195 ± Nbkgd1 = 24781 196 ± Nbkgd2 = 24929 0.0000075 ± md = 1.8642766 0.000050 ± sigmap1 = 0.006778 0.32 ± xi = -13.221

= 72.6 2 2χ = 54.1, 1 2χ

Fit Parameters