mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 214 ± N1 = 39685 214 ± N2 = 39582 153 ± Nbkgd1 = 17165 153 ± Nbkgd2 = 17256 0.0000063 ± md = 1.8642619 0.000047 ± sigmap1 = 0.004106 0.39 ± xi = -9.158

= 72.0 2 2χ = 78.8, 1 2χ

Fit Parameters