mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 +π ^+ K^-K→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 -π ^- K^+K→^-D

1

-π ^- K^+K→^-D Fit Parameters 73 ± N1 = 3532 72 ± N2 = 3513 96 ± Nbkgd1 = 7392 95 ± Nbkgd2 = 7276 0.000023 ± md = 1.869090 0.00026 ± sigmap1 = 0.00500 0.60 ± xi = -8.690

= 55.9 2 2χ = 64.1, 1 2χ

Fit Parameters