mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 278 ± N1 = 70313 279 ± N2 = 70997 124 ± Nbkgd1 = 8405 125 ± Nbkgd2 = 8430 0.0000056 ± md = 1.8646695 0.000035 ± sigmap1 = 0.006395 0.55 ± xi = -24.229

= 146.5 2 2χ = 167.3, 1 2χ

Fit Parameters