mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^+ K^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^- K^+K→^-D

1

-π ^- K^+K→^-D Fit Parameters 98 ± N1 = 9402 97 ± N2 = 9341 15 ± Nbkgd1 = 108 15 ± Nbkgd2 = 101 0.000011 ± md = 1.869414 0.000100 ± sigmap1 = 0.004466 7.6 ± xi = -14.68

= 47.5 2 2χ = 26.9, 1 2χ

Fit Parameters