mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 14 ± N1 = 39755 14 ± N2 = 39652 9.7 ± Nbkgd1 = 17096.0 9.7 ± Nbkgd2 = 17187.0 0.00000040 ± md = 1.86426423 0.010 ± p = 0.465 0.0000029 ± sigmap1 = 0.0041282 0.54 ± xi = -7.470

= 69.6 2 2χ = 77.3, 1 2χ

Fit Parameters