mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 258 ± N1 = 50377 260 ± N2 = 50641 203 ± Nbkgd1 = 24913 205 ± Nbkgd2 = 25063 0.0000076 ± md = 1.8642767 0.018 ± p = 0.578 0.000057 ± sigmap1 = 0.007770 0.89 ± xi = -16.873

= 72.9 2 2χ = 59.3, 1 2χ

Fit Parameters