mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^+ K^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^- K^+K→^-D

1

-π ^- K^+K→^-D Fit Parameters 101 ± N1 = 9411 100 ± N2 = 9350 36 ± Nbkgd1 = 99 35 ± Nbkgd2 = 92 0.000011 ± md = 1.869415 0.89 ± p = 1.50 0.00011 ± sigmap1 = 0.00478 77 ± xi = -45.3

= 46.6 2 2χ = 28.5, 1 2χ

Fit Parameters