mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 152 ± N1 = 20306 153 ± N2 = 20575 76 ± Nbkgd1 = 2983 76 ± Nbkgd2 = 2920 0.0000090 ± md = 1.8694290 0.053 ± p = 0.781 0.000043 ± sigmap1 = 0.003683 2.7 ± xi = -37.43

= 65.1 2 2χ = 39.5, 1 2χ

Fit Parameters