mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 153 ± N1 = 12844 153 ± N2 = 12756 198 ± Nbkgd1 = 28919 200 ± Nbkgd2 = 29654 0.000016 ± md = 1.869092 0.015 ± p = 0.513 0.00010 ± sigmap1 = 0.00458 0.75 ± xi = -10.883

= 69.9 2 2χ = 50.1, 1 2χ

Fit Parameters