mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-K

→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+K

→^0D

1

→^0D^{Fit Parameters} 198 ± N1 = 39157 199 ± N2 = 39558 12 ± Nbkgd1 = 53 8.5 ± Nbkgd2 = 30.2 0.0000056 ± md = 1.8646052 0.000037 ± sigmap1 = 0.003741 9.7 ± xi = -16.99

= 35.1 2 2χ = 33.8, 1 2χ

Fit Parameters