mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 213 ± N1 = 43922 214 ± N2 = 44519 57 ± Nbkgd1 = 1783 57 ± Nbkgd2 = 1756 0.0000053 ± md = 1.8646072 0.062 ± p = 0.552 0.000038 ± sigmap1 = 0.003959 3.2 ± xi = -16.73

= 53.8 2 2χ = 65.9, 1 2χ

Fit Parameters