mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 149 ± N1 = 19751 150 ± N2 = 20016 73 ± Nbkgd1 = 2689 72 ± Nbkgd2 = 2627 0.0000094 ± md = 1.8694238 0.050 ± p = 0.715 0.000051 ± sigmap1 = 0.004117 2.6 ± xi = -32.85

= 62.1 2 2χ = 38.1, 1 2χ

Fit Parameters