mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 122 ± N1 = 13438 122 ± N2 = 13362 55 ± Nbkgd1 = 1482 55 ± Nbkgd2 = 1509 0.0000044 ± md = 1.8694492 0.042 ± p = 0.755 0.000085 ± sigmap1 = 0.006178 2.1 ± xi = -42.37

= 55.8 2 2χ = 51.6, 1 2χ

Fit Parameters