mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D^{Fit Parameters} 134 ± N1 = 8275 134 ± N2 = 8285 226 ± Nbkgd1 = 41201 224 ± Nbkgd2 = 40704 0.000018 ± md = 1.869070 0.013 ± p = 0.509 0.00019 ± sigmap1 = 0.00392 0.61 ± xi = -9.944

= 48.6 2 2χ = 51.3, 1 2χ

Fit Parameters