mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 153 ± N1 = 20431 154 ± N2 = 20700 75 ± Nbkgd1 = 2853 75 ± Nbkgd2 = 2788 0.0000094 ± md = 1.8694285 0.055 ± p = 0.724 0.000052 ± sigmap1 = 0.004164 2.8 ± xi = -33.33

= 63.3 2 2χ = 39.4, 1 2χ

Fit Parameters