mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π _SK

→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π _SK

→^-D

1

→^-D^{Fit Parameters} 192 ± N1 = 36652 192 ± N2 = 36724 20 ± Nbkgd1 = 131 20 ± Nbkgd2 = 129 0.0000055 ± md = 1.8694149 0.00000051 ± sigmap1 = 0.00200000 7.2 ± xi = -31.15

= 70.7 2 2χ = 79.2, 1 2χ

Fit Parameters