mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 158 ± N1 = 13275 157 ± N2 = 13125 206 ± Nbkgd1 = 30657 205 ± Nbkgd2 = 30817 0.000016 ± md = 1.869111 0.015 ± p = 0.524 0.00014 ± sigmap1 = 0.00687 0.75 ± xi = -10.552

= 66.8 2 2χ = 59.1, 1 2χ

Fit Parameters