mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-K

→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+K

→^0D

1

→^0D^{Fit Parameters} 203 ± N1 = 41003 203 ± N2 = 41260 9.4 ± Nbkgd1 = 48.7 8.1 ± Nbkgd2 = 37.1 0.0000054 ± md = 1.8646127 0.000035 ± sigmap1 = 0.003798 7.0 ± xi = -1.32

= 36.2 2 2χ = 38.5, 1 2χ

Fit Parameters