mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 283 ± N1 = 69787 283 ± N2 = 69936 139 ± Nbkgd1 = 8856 139 ± Nbkgd2 = 9084 0.0000054 ± md = 1.8646658 0.032 ± p = 0.845 0.000037 ± sigmap1 = 0.006329 1.6 ± xi = -41.56

= 88.3 2 2χ = 72.8, 1 2χ

Fit Parameters