mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 151 ± N1 = 20519 152 ± N2 = 20805 70 ± Nbkgd1 = 2585 72 ± Nbkgd2 = 2712 0.0000061 ± md = 1.8694352 0.052 ± p = 0.741 0.000031 ± sigmap1 = 0.004255 2.6 ± xi = -32.53

= 46.8 2 2χ = 58.8, 1 2χ

Fit Parameters