mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 124 ± N1 = 13612 124 ± N2 = 13650 56 ± Nbkgd1 = 1472 57 ± Nbkgd2 = 1544 0.000013 ± md = 1.869451 0.079 ± p = 0.883 0.000086 ± sigmap1 = 0.006213 4.0 ± xi = -44.77

= 54.9 2 2χ = 53.6, 1 2χ

Fit Parameters