mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-K

→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+K

→^0D

1

→^0D^{Fit Parameters} 165 ± N1 = 25754 166 ± N2 = 26252 56 ± Nbkgd1 = 1823 55 ± Nbkgd2 = 1756 0.0000074 ± md = 1.8642575 0.065 ± p = 0.176 0.000051 ± sigmap1 = 0.004084 2.1 ± xi = -0.10

= 80.9 2 2χ = 79.3, 1 2χ

Fit Parameters