mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-K

→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+K

→^0D

1

→^0D^{Fit Parameters} 164 ± N1 = 25766 166 ± N2 = 26264 55 ± Nbkgd1 = 1811 54 ± Nbkgd2 = 1743 0.0000073 ± md = 1.8642572 0.054 ± p = 0.176 0.000048 ± sigmap1 = 0.003849 1.3 ± xi = -0.10

= 82.2 2 2χ = 80.4, 1 2χ

Fit Parameters