mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 259 ± N1 = 50493 260 ± N2 = 50758 204 ± Nbkgd1 = 24797 205 ± Nbkgd2 = 24947 0.0000075 ± md = 1.8642755 0.018 ± p = 0.560 0.000052 ± sigmap1 = 0.006522 0.90 ± xi = -15.858

= 63.4 2 2χ = 54.2, 1 2χ

Fit Parameters