mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 219 ± N1 = 46208 220 ± N2 = 46756 60 ± Nbkgd1 = 1984 59 ± Nbkgd2 = 1956 0.0000052 ± md = 1.8646063 0.058 ± p = 0.523 0.000036 ± sigmap1 = 0.003863 3.0 ± xi = -14.93

= 64.1 2 2χ = 74.0, 1 2χ

Fit Parameters