mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 153 ± N1 = 20474 154 ± N2 = 20747 76 ± Nbkgd1 = 2815 76 ± Nbkgd2 = 2748 0.0000094 ± md = 1.8694277 0.055 ± p = 0.698 0.000044 ± sigmap1 = 0.003370 2.9 ± xi = -31.63

= 66.5 2 2χ = 42.8, 1 2χ

Fit Parameters